% !TEX encoding = UTF-8 Unicode
\thispagestyle{empty}
\begin{center}
	\begin{latin}
		\includegraphics{logo}
		
		\begin{large}
		Sharif University of Technology \\ \enDep{} 
		\vskip 0.8cm
		\enlevel{} \entype{} \\ \enmajor{}
		
		\end{large}
		\vskip 3cm
		{Topic}         \\ \large{ \textbf{\entitle}}
		\vskip 3 cm
		{By}         \\ \large{\enAuthor}
		\vskip 0.75 cm
		{Supervisor} \\ \large{\ensupervisor}
		\vskip 1cm
		\large{\engdate}
	\end{latin}
\end{center}

